From edb8c7a8aad780ca76abe3ff5d17cf05bad9d0fe Mon Sep 17 00:00:00 2001
From: Xanadu <none@none>
Date: Mon, 14 Jun 2010 22:22:11 +0200
Subject: Removed useless comment columns from the pool system DB tables.

--HG--
branch : trunk
---
 sql/base/world_database.sql | 2 --
 1 file changed, 2 deletions(-)

(limited to 'sql/base/world_database.sql')

diff --git a/sql/base/world_database.sql b/sql/base/world_database.sql
index 4ef57d79fdd..88d8e282749 100644
--- a/sql/base/world_database.sql
+++ b/sql/base/world_database.sql
@@ -4210,7 +4210,6 @@ CREATE TABLE `pool_creature` (
   `guid` int(10) unsigned NOT NULL DEFAULT '0',
   `pool_entry` mediumint(8) unsigned NOT NULL DEFAULT '0',
   `chance` float unsigned NOT NULL DEFAULT '0',
-  `comment` varchar(255) DEFAULT NULL,
   `description` varchar(255) DEFAULT NULL,
   PRIMARY KEY (`pool_entry`,`guid`),
   KEY `idx_guid` (`guid`)
@@ -4287,7 +4286,6 @@ DROP TABLE IF EXISTS `pool_template`;
 CREATE TABLE `pool_template` (
   `entry` mediumint(8) unsigned NOT NULL DEFAULT '0' COMMENT 'Pool entry',
   `max_limit` int(10) unsigned NOT NULL DEFAULT '0' COMMENT 'Max number of objects (0) is no limit',
-  `comment` varchar(255) DEFAULT NULL,
   `description` varchar(255) DEFAULT NULL,
   PRIMARY KEY (`entry`)
 ) ENGINE=MyISAM DEFAULT CHARSET=utf8;
-- 
cgit v1.2.3

