From 12a52d2fbb3aef60f7eff73d1a10e0dbe9de5edf Mon Sep 17 00:00:00 2001
From: runningnak3d <none@none>
Date: Wed, 24 Dec 2008 09:03:40 +0000
Subject: * fixed typo for Electrical Storm spell * removed Wyvern Sting rank 5
 and rank 6 from spell_linked_spell since they * are not available till wotlk
 :P * Ok, who was on crack?

--HG--
branch : trunk
---
 sql/updates/615_world.sql | 7 +++++++
 1 file changed, 7 insertions(+)
 create mode 100644 sql/updates/615_world.sql

(limited to 'sql/updates/615_world.sql')

diff --git a/sql/updates/615_world.sql b/sql/updates/615_world.sql
new file mode 100644
index 00000000000..28512e8511e
--- /dev/null
+++ b/sql/updates/615_world.sql
@@ -0,0 +1,7 @@
+-- Wyvern Sting rank 5 and 6 not avail. till wotlk
+DELETE FROM spell_linked_spell WHERE `spell_trigger` IN (-49011, -49012);
+
+-- typo
+DELETE FROM `spell_linked_spell` WHERE `spell_trigger` IN (43468, 43648);
+INSERT INTO spell_linked_spell (`spell_trigger`, `spell_effect`, `type`, `comment`) VALUES (43648, 44007, 1, 'Storm Eye Safe Zone');
+
-- 
cgit v1.2.3

